#----------------------------------------
# Nesta/IO server definition.
#  standard value of scale-factor is 100.
#----------------------------------------
# ip-addr      port  scale-factor
192.168.30.10  11211 100
192.168.30.11  11211 150
192.168.30.12  11211 80
192.168.30.13  11211 100
192.168.30.14  11211 150
192.168.30.15  11211 100
